mixture

20 40 60 80 100 120 140 160 100 200 300 model 1

20 40 60 80 100 120 100 200 300 model 2

20 40 60 80 100 120 100 200 300

speaker 1 reconstruction (algonquin)

20 40 60 80 100 120 140 160 100 200 300

speaker 2 reconstruction (algonquin)

20 40 60 80 100 120 140 160 100 200 300